θ cos 0.2 0.4 0.6 0.8

mμ/_{ϕr}σ

5 10 15 20 25 30_{GLD}

GLDPrime GLD4LDC

= 17.5 mm) min (B=3.0 T, R = 16 mm) min (B=3.5 T, R = 15 mm) min (B=4.0 T, R c)